<template>
    <div>
        <div class="md-content" data-md-component="content">
              <article class="md-content__inner md-typeset">
                
                  


<h1 id="jupyterlab">JupyterLab<a class="headerlink" href="#jupyterlab" title="Permanent link">¶</a></h1>
<hr>
<blockquote>
<p>⚠️JupyterLab的工作目录为<code>/root</code>目录，而非<code>/</code>系统根目录。如需查看根目录<code>/</code>，可以进入终端使用命令行操作。</p>
</blockquote>
<h2 id="_1">基本功能介绍<a class="headerlink" href="#_1" title="Permanent link">¶</a></h2>
<p>进入jupyterlab，控制台 -&gt; 容器实例 -&gt; Jupyterlab</p>
<p><img alt="image_20250307155430" src="../jupyterlab.assets/image_20250307155430.png"></p>
<p>JupyterLab界面说明</p>
<p><img alt="image_20250307162801" src="../jupyterlab.assets/image_20250307162801.png"></p>
<p>上传文件</p>
<p><img alt="image_20250307161341" src="../jupyterlab.assets/image_20250307161341.png"></p>
<p>使用Notebook</p>
<p><img alt="image_20250307161509" src="../jupyterlab.assets/image_20250307161509.png"></p>
<p>打开新终端</p>
<p><img alt="image_20250307161553" src="../jupyterlab.assets/image_20250307161553.png"></p>
<p><img alt="image_20250307161635" src="../jupyterlab.assets/image_20250307161635.png"></p>
<p>访问打开的终端或Notebook（JupyterLab在关闭终端/Notebook选项卡后默认不会终止，仍然在运行）</p>
<p><img alt="image_20250307161714" src="../jupyterlab.assets/image_20250307161714.png"></p>
<p>文件管理</p>
<p><img alt="image-20210820115753524" src="../jupyterlab.assets/image-20210820115753524.png"></p>
<h2 id="_2">附：使用常见问题<a class="headerlink" href="#_2" title="Permanent link">¶</a></h2>
<p>如果用Notebook跑程序的同学会发现，隔了一段时间Notebook的日志不更新了。此时可以使用「日志控制台」的功能查看日志，演示一遍过程：</p>
<p>如下一段程序执行起来后，刷新网页此时会发现日志不再更新</p>
<p><img alt="image_20250307161831" src="../jupyterlab.assets/image_20250307161831.png"></p>
<p>打开日志控制台：</p>
<p><img alt="image-20221028152841811" src="../jupyterlab.assets/image-20221028152841811.png"></p>
<p><img alt="image-20221028152930038" src="../jupyterlab.assets/image-20221028152930038.png"></p>





                
              </article>
            </div>
    </div>
</template>